From 4ff8080a4efcc15dfd41f4c45d49de19c1130cf7 Mon Sep 17 00:00:00 2001
From: Sam Anthony <sam@samanthony.xyz>
Date: Mon, 15 Dec 2025 13:56:55 -0500
Subject: report: abstract

---
 doc/report/report.tex | 4 +++-
 1 file changed, 3 insertions(+), 1 deletion(-)

(limited to 'doc/report/report.tex')

diff --git a/doc/report/report.tex b/doc/report/report.tex
index 90f5553..09edc91 100644
--- a/doc/report/report.tex
+++ b/doc/report/report.tex
@@ -35,7 +35,9 @@
 \pagestyle{plain}
 
 \begin{abstract}
-	TODO
+	An electronic device is developed that allows analog needle gauges to be retrofitted into a car's EMS (engine management system) while leveraging the capabilities of its CAN (controller area network) bus.
+	The proceedings of the project are reported-on, including hardware design, firmware and software development, and testing.
+	Finally, the outcomes of the project are assessed against the initial goals, with the overall conclusion being positive.
 \end{abstract}
 
 \tableofcontents
-- 
cgit v1.2.3

